analyzed_12_07.ps

Main-chain bond lengths

analyzed_12

PROCHECK

Page 1

1.20 1.24 1.28 1.32 1.36 1.40 1.44

50

100

150

200 C-N (except Pro)

Frequency

1.22 1.26 1.30 1.34 1.38 1.42 1.46

50

100

150

200 C-N_{(Pro)}

Frequency

1.11 1.15 1.19 1.23 1.27 1.31 1.35

50

100

150

200 C-O

Frequency

1.40 1.44 1.48 1.52 1.56 1.60 1.64

50

100

150

200 CA-C

(except Gly)

Frequency

1.39 1.43 1.47 1.51 1.55 1.59 1.63

50

100

150

200 CA-C

(Gly)

Frequency

1.40 1.44 1.48 1.52 1.56 1.60 1.64

50

100

150

200 CA-CB

(Ala)

Frequency

1.41 1.45 1.49 1.53 1.57 1.61 1.65

50

100

150

200 CA-CB

(Ile,Thr,Val)

Frequency

1.40 1.44 1.48 1.52 1.56 1.60 1.64

50

100

150

200 CA-CB

(the rest)

Frequency

1.33 1.37 1.41 1.45 1.49 1.53 1.57

50

100

150

200 N-CA

(except Gly,Pro)

Frequency

1.33 1.37 1.41 1.45 1.49 1.53 1.57

50

100

150

200 N-CA

(Gly)

Frequency

1.34 1.38 1.42 1.46 1.50 1.54 1.58

50

100

150

200 N-CA

(Pro)

Frequency

Black bars > 2.0 st. devs. from mean.

Solid and dashed lines represent the mean and standard deviation values as per Engh & Huber small-molecule data.